1 TERminal
  TERminal /parameter/parameter		to change your terminal
  TERminal TTn:[TTm:]/parameter		to change other terminals
 
		sets terminal type or characteristics, and line options
 
			type AID TER CHAR for terminal characteristics
			type AID TER TYPE for terminal types
			type AID TER OPTIONS for line options
2 CHAR
  The valid (negateable) characteristics are:
 
  ALTMODE	    ANSISEQUENCE	BACKSPACE	    BLOCKMODE
  CARRIAGERETURN    [CR]		COMPATIBLE	    CONTROLCFLUSH
  [CCF]		    CONTROLS		[CSQ]		    DEFAULT
  DS		    ESCAPESEQUENCE	FORMSMODE	    FULLDUPLEX
  HANGUP	    HARDWAREFORMFEED	[HFF]		    HARDWARETAB
  [HTAB]	    HOLD		KEYBOARD	    LOCALCOPY
  LOWERCASEKEYBOARD [LCKEYBOARD]	[LCK]		    LOWERCASEINPUT
  [LCINPUT]	    [LCI]		LOWERCASEOUTPUT	    [LCOUTPUT]
  [LCO]		    LOWERCASEPRINTER	[LCPRINTER]	    [LCP]
  LVF		    NEWLINE		NONSTANDARDTAB	    [NSTAB]
  NOPARITY	    PASALLBITS	        PRINTER		    PROCESSCONTROLC
  SCOPE		    SIMULATEFORMFEED    [SFF]		    TAPE
  TWOSTOPBITS	    [TSB]	        VERTICALFILL	    [VFILL]
2 TYPE
  The valid terminal types are:
 
  ASR33		KSR33		ASR35		VT05
  VT50		VT52		VT61		VT100
  LA30S		LA30P		LA36		LA120
  LA180S	ADAM3		BEEHIVE		SOROC
2 OPTIONS
 
 The valued options are:
  SPEED:n		'n' is numeric, 134, 'EXTA' or 'EXTB'
  SPEED:(m:n)		'm' is the keyboard. 'n' is the printer.
  READAHEAD:type	Type may be one of:
  		NONE
	  	DEFERREDPROCESSING [DP]
	  	IMMEDIATEPROCESSING [IP]
  NAME:type		(typ AID TER TYPE for valid types)
  FILL:n		Normally 0 - 6 and 7 for a LA30S
  WIDTH:n		Set page width.
  LENGTH:n		Set page length.
  HANGUP		Hang up dialup line.
  PARITY:[EVEN!ODD]	Set parity type for line.
  NOPARITY		Disable parity generation and checking.
   
