The format of the SHOW command is:

   SHOW component component-options [TO output file]

Component types are:

   ALIAS
   EXECUTOR
   LINE
   LOGGING
   NODE
   OBJECT
   PROCESS
   SYSTEM

For more help use:

   HELP component-type
   HELP SHOW component-type
   HELP SHOW TO
2 ALIAS
Use the SHOW ALIAS command to display information about aliases.  The
formats are:

   SHOW ALIAS alias-name [information-type] [[SCOPE scope]]
   SHOW ACTIVE ALIASES [information-type] [[SCOPE scope]]
   SHOW KNOWN ALIASES [information-type] [[SCOPE scope]]
   SHOW ALL ALIASES [information-type]

Information types are SUMMARY (the default) and CHARACTERISTICS.

For more help use:

   HELP ALIAS
   HELP ALIAS SCOPE
2 EXECUTOR
Use the SHOW EXECUTOR command to display information about the executor node.
The format is:

   SHOW EXECUTOR [information-type]

Information types are SUMMARY (the default), STATUS, COUNTERS, and
CHARACTERISTICS.

For more help use:

   HELP EXECUTOR
2 LINE
Use the SHOW LINE command to display information about lines.  The
formats are:

   SHOW LINE line-id [information-type]
   SHOW ACTIVE LINES [information-type]
   SHOW KNOWN LINES [information-type]

Information types are SUMMARY (the default), STATUS, COUNTERS, and
CHARACTERISTICS.

For more help use:

   HELP LINE
2 LOGGING
Use the SHOW LOGGING command to display information about the logging
sinks.  The formats are:

   SHOW LOGGING MONITOR [information-type] [sink-node]
   SHOW ACTIVE LOGGING [information-type] [sink-node]
   SHOW KNOWN LOGGING [information-type] [sink-node]

Information types are SUMMARY (the default), STATUS, and EVENTS.

For more help use:

   HELP LOGGING
   HELP LOGGING SINKS
2 NODE
Use the SHOW NODE command to display information about the executor's
perception of nodes.  The formats are:

   SHOW NODE node-id [information-type]
   SHOW ACTIVE NODES [information-type]
   SHOW KNOWN NODES [information-type]
   SHOW LOOP NODES [information-type]

Information types are SUMMARY (the default), STATUS, COUNTERS, and
CHARACTERISTICS.

For more help use:

   HELP NODE
2 OBJECTS
Use the SHOW OBJECT command to display information about objects.  The
formats are:

   SHOW OBJECT object-name [information-type]
   SHOW KNOWN OBJECTS [information-type]

Information types are SUMMARY (the default), CHARACTERISTICS, and STATUS.

For more help use:

   HELP OBJECT
2 PROCESS
Use the SHOW PROCESS command to display information about processes.  The
formats are:

   SHOW PROCESS process-name [information-type]
   SHOW ACTIVE PROCESSES [information-type]
   SHOW KNOWN PROCESSES [information-type]

Information types are SUMMARY (the default), STATUS, and COUNTERS.

For more help use:

   HELP PROCESS
2 TO
Use the TO option on any SHOW command to direct the output to a file or
device other than the terminal where NCP is running.  The format is:

   SHOW component [component-option] [TO output-specification]

Where output-specification is any available output file or device.  The
information will be output in the same format that it would have been
displayed on the terminal.  If a file is chosen and it already exists,
the information is appended to the file.
2 SYSTEM
Use the SHOW SYSTEM command to display information about the DECnet system.
The format is:

   SHOW SYSTEM [information-type]

Information types are SUMMARY (the default), STATUS, COUNTERS, and
CHARACTERISTICS.

For more help use:

   HELP SYSTEM
