The format of the LOAD command is:

   LOAD target target-options

Target types are:

   NODE
   VIA

For more help use:

   HELP LOAD target-type
2 NODE
Use the LOAD NODE command to down-line load the specified node.

The format of the LOAD NODE command is:

   LOAD NODE node-id [options]

The options are:

   ADDRESS       HOST        SECONDARY       TERTIARY
   FROM          NAME        PASSWORD        VIA

For more help use:

   HELP LOAD option
2 VIA
VIA can be used either as a target type or as an option on the LOAD NODE
command.

Use the LOAD VIA command to perform a down-line load on the specified line.
The format is:

   LOAD VIA line-id [option]

The options are:

   ADDRESS       HOST        SECONDARY       TERTIARY
   FROM          NAME        PASSWORD

For more help use:

   HELP LOAD option

Use the VIA option on the LOAD NODE command to select the line that is used
to get to the target node.  This will override the line in the default data
base that was created at network generation.  The format is:

   LOAD NODE node-id [VIA line-id]
2 ADDRESS
Use the ADDRESS option to specify the node address that the target is to use
to identify itself when it comes up.  This will override the address that was
used to identify the node.  The format is:

   LOAD target [ADDRESS node-address]
2 FROM
Use the FROM option to specify the system image file that is to be loaded into
the target.  This will override the load file in the default data base that was
created at network generation.  The format is:

   LOAD target [FROM file-specification]
2 HOST
Use the HOST option to specify the host that the target node is to use when it
comes up.  This will override the load file in the default data base that was
created at network generation.  The format is:

   LOAD target [HOST node-id]
2 NAME
Use the NAME option to specify the node name that the target is to use to
identify itself when it comes up.  This will override the name that was used to
identify the node.  The format is:

   LOAD target [NAME node-name]
2 PASSWORD
Use the PASSWORD option to specify the password that is to be used to verify
service access over the line.  This will override the service password in the
default data base that was created at network generation.

The format of the PASSWORD option is:

   LOAD target [[SERVICE] PASSWORD] password

Where password is a hexadecimal number representing the bits to be used.  The
password is in the range 0-FFFFFFFFFFFFFFFF to represent up to 64 bits (8
bytes) of password.  The length of the password (in bytes) is determined by
the number of characters input.  For example a password of 0 is only one
byte long, a password of 00000 is 3 bytes long.
2 SECONDARY
Use the SECONDARY LOADER option to specify the secondary loader that is to be
in loading the target node.  This will override the default that is determined
either from information received from the target or from the default data base
created at network generation.  The format is:

   LOAD target [SECONDARY [LOADER] file-specification]
2 TERTIARY
Use the TERTIARY LOADER option to specify the tertiary loader that is to be
in loading the target node.  This will override the default that is determined
either from information received from the target or from the default data base
created at network generation.  The format is:

   LOAD target [TERTIARY [LOADER] file-specification]
