1 LIS
               LIST-11 is a program for reformatting ASCII files.   It  can
          put  up  to 10 columns of text on a single page
 
 COMMAND FORMAT:
            LIS [FILEOUT=FILEIN/SWITCHES]
 Switches
	/CO	Specify the number of columns.
		If 0 is specified, as many as will fit will be used.
	/TR	Cause lines which are too wide to be truncated. If not spe-
		cified, lines which are too long will be continued on the
		next line.
	/NH	Omit the standard 2-line identifying header.
	/FF	Form-feeds in the input cause a skip to the next column.
	/CD	Convert Tab's to spaces.
	/WI	Specify output page width.
	/LE	Specify output page length.
	/PA	Pause between pages and wait for <CR>
	/ED	Change form-feed characters to control-D
	/RO:n	Output is on roll paper n lines long.
	/UC	Force Upper Case output.
	/NP	Supress pagination, (no headers, form-feeds, etc.)]
