 Kermit-IAS commands :
 
 C [TTnn]   _ connection with remote computer .You have to specify tty line
              before typing this command without an argument.
 D [level]  - specifies one of 3 debug levels ( 0, 1, 2 ). Default level is 0.
 E code     - specifies a character ( in decimal ASCII code) to escape from
              connect mode.
 H          - displays this text.
 I [ON/OFF] - specifies image mode. To transfer no ascii files switch image 
              ON. Default image mode is OFF.
 L [TTnn]   - specifies tty line for file tranfers and connect mode. Default
              line is TI. ( Can only be set once, and cannot be changed )
 M file 4   - specifies unit to print debug messages. Default unit is 5.
 P [nn]     - says to Kermit-IAS to wait nn seconds before
              sending or receiving files .It lets you pass to
              the other kermit and enter receive or send command.
 R          - receive command. Kermit-IAS receives files sended by the other
              kermit.
 S files    - Kermit-IAS sends files to the other kermit. You can specify files
              as *.* ,TOT*.* , DP1:[12,34]*WEWQ%.IMG , TRA1%%.IMG;0 and so on.
              The character * corresponds to any string, % replaces any 
              character.
 CTRL/Z	    - exits Kermit-IAS.
