1 FDU
	FDUmp lists output in OCTAL,ASCII, and RAD50 on the same line of print
	 
	FDUmp supports 2 switches
 
	/A
	this specifies the offsets for each line to be listed relative to
	the beginning of the file. that is, block 1 starts at '000000, block
	2 starts at 1000, block 3 at 2000 ....etc.
	 
	/BL:n:m			List blocks n thru m inclusive
	or
	/BL:n			List blocks n thru end of file inclusive
 
 
	Calling proceedure:
	 
	MCR>FDU filespec[/switches]
	 
				where filespec is a file name of the form
				DDN:[GGG,UUU]NAME.TYP;VERS
	 
	output will be spooled to LP0:
