1 BDI

  BDI will produce a directory listing of a BRU Tapeset (up to some limit -
  currently 10000 files) in a format related to that used by PIP.

  operating proceedure:
  MCR>BDI
  *** BRU Directory Listing x01.00
  Input Tapedeck:		    <enter device name (MT: or MM:)
  Density (800/1600):		    <enter tape density
  Listing format (FULL,BRIEF,LIST)  <enter format, *(same as PIP listings)
  Output file			    <enter file name, (CR defaults to TI:)
  .
  .
  .
  *EOT*				    <signals end of run (MCR not recalled)
