CKUDI2.C is an alternate version of the Unix Kermit dial module.
It includes support for the DEC DF series modems, and also for an
"unknown" modem type.  The code has been reorganized to collect the
information for the various modems into structures, rather than many
parallel arrays.  It has not replaced the primary version of the
dialer module (CKUDIA.C) because it has not been thoroughly tested.
Herm Fischer (HFISCHER@USC-ECLB) wrote the original, the modifications
were done by Dan Schullman (d_schullman%sarah.DEC@DECWRL).
