Sperry Univac KERMIT was contributed by

  Paul Stevens
  Madison Academic Computing Center
  1210 West Dayton Street
  University Of Wisconsin
  Madison, Wisconsin  53706
  (608) 262-9618

Here is the text of his letter:  "For what it is worth, here is our version of
KERMIT that runs on Sperry 100/82.  Documentation is meager.  Instructions for
users are in the listing itself in the form of `HELP' strings.  Instructions
for implementing on other 1100 computers amount to a few comments on page 1.
Probably the most helpful comment consists of my name, address, and phone
number.  Good luck!"

A subsequent phone conversation revealed that there actually is a manual, which
you may obtain by sending a self-addressed stamped envelope to the above.  It
is not included with the distribution since there is no plain-text version of
it (it was for a particular photocomposer using a text formatter than cannot
produce plain text).

The program is written in Univac 1100 Exec assembly language.  The unusual use
of alphabetic case in the listing is not a mistake; the author actually typed
it in that way.

There is also a version of KERMIT for the Univac 1100 written in Ratfor to run
under the Software Tools environment.  See STKERMIT.*.
