Support for CP/M-80 KERMIT for the Rainbow has been discontinued.  It only ran
at speeds of 1800 baud or below, and it did not run at all under the new
release (2.0) of DEC's CP/M-86/80.  The newer CP/M-86 KERMIT should be used
instead.  It is stored in the KERMIT distribution area as 86*.* and RB*.*.
