All the files in the KERMIT distribution beginning with VMS are for the
VAX/VMS implementation.  There are no binaries, so recipients must build the
KERMIT-32 program themselves on a VAX.  Before following the instructions
you will find in VMSMIT.DOC, do this:

1. Copy VMS*.* to your VAX.

2. Discard this file, VMSKERMIT.HLP.

3. On the VAX, rename VMSINSTAL.COM to INSTAL.COM.

4. Rename the remaining files to replace the initial VMS in the filenames
   with KER.  For instance, VMSMIT.DOC becomes KERMIT.DOC.

Now you can follow the instructions in KERMIT.DOC for installing VAX/VMS
KERMIT.
