UCSD Pascal KERMIT from Cornell University

This implementation of KERMIT was done by Kate MacGregor of Cornell Computing
Services for the Terak p-System.  It is broken up into several modules, some
system independent, some system dependent.  These modules have been renamed to
fit the naming conventions of the KERMIT distribution area (to allow related
files to grouped together alphabetically, and to fit within the filename
restrictions of some systems we ship KERMIT to).

The files have been renamed as follows:

UCSD Name        KERMIT Distribution Name
--------------   ------------------------
HELP.TEXT        UCHELP.PAS
KBDHANDLR.TEXT   UCKBDH.MAC
KERMIT.TEXT      UCKERM.PAS
KERMITHLP.TEXT   UCKERM.HLP
PARSER.TEXT      UCPARS.PAS
RCVHANDLR.TEXT   UCRCVH.MAC
RECSW.TEXT       UCRCVS.PAS
SENDB.TEXT       UCSNDB.MAC
SENDSW.TEXT      UCSNDS.PAS

The .PAS files are Pascal source files (which should be mostly system
independent), the .MAC files are MACRO-11 source files for the Terak, and the
.HLP file contains user documentation, instructions for building UCSD Pascal
Kermit for the Terak, and hints on adapting it to other machines.

[End of USCD.HLP, Oct 1983]
