The HP Kermit source files, like those of a few other implementations,
have different names on the distribution tape than they must have on
the system on which they will be compiled and run.  This is done to
make the names agreeable to as many systems as possible (e.g., making
the name less than 9 characters so a VAX/VMS system will like it).
Once the files are on whatever host system you are using (having been
FTPed or copied from the distribution tape), you must rename them
according to the table below before moving them to the target HP
system.  This is VERY important, because if you don't at least change
the extension to .TEXT, the HP file system will store them in the
wrong format, and the editor, compiler, etc. will refuse to have
anything to do with them.


Kermit Distrution Name    HP Pascal System Name   Description

 HP9CMD.PAS                KRMCMD.TEXT            Command Parser
 HP9COMP.CMD               KRMCOMP.TEXT           Compilation Procedure
 HP9GUTS.PAS               KRMGUTS.TEXT           Protocol Module
 HP9IO.PAS                 KRMIO.TEXT             I/O Modules
 HP9KERMIT.DOC             KRMDOC.TEXT            Documentation
 HP9LINK.CMD               KRMLINK.TEXT           Linking Procedure
 HP9MAIN.PAS               KRMMAIN.TEXT           Main Program Modules
 HP9RPT.PAS                KRMRPT.TEXT            Error Reporting Modules
 HP9WNDW.PAS               KRMWNDW.TEXT           Window Management Modules
