	MONITOR -- A RSX11M/M+ Perforance Monitoring Package

   The monitor consists of three tasks:

         1). MON -- System sampling task
         2). STM -- Tells mon its time to stop
         3). MRP -- Outputs a report to file SY:[1,2]MONITOR.RPT


   To get started you need:

      1). UIC [312,114] on device SY:
      2). Put tape contents into SY:[213,114]
      3). Type MCR>@MONITOR to assemble and task build the monitor

                             ***NOTE***
		   EXEMC.MLB  must be in LB:[1,1]
		   RSXMC.MAC  must be in LB:[11,10]
		   RSX11M.STB must be in LB:[1,54]


 Command Switches:

   /NOPC - no task pc execution trace
   /NOME - no memory statistics
   /NOIO - no i/o statistics
   /NODR - no directive statistics
   /NOAL - none of the above

  To run the monitor:

                                ***NOTE***
            This task can only be run 1 time after it has been fixed
            in memory or the system is likely to crash

      1). Type:

	 MCR>@[10,140]STARTMON

	or

	 MCR>INS MON
         MCR>FIX MON
	 MCR>INS STM
	 MCR>INS MRP
	 MCR>MON /SW1/SW2.../SWN<cr>

      2). To stop the monitor type MCR>STM<CR>
      3). To print the report type MCR>PRI [1,2]MONITOR.RPT


