
  P-PHASE SINGLE TAG COMMANDS
 
  NA              NIBAX,NIBST,NIBLT               Nib sizes: Axes features
  CA              LCAX,LCST,LCLT                  Color: Axis features
  XA              XMARGL,XLNGTH,XMARGR            X-Axis physical definition
  YA              YMARGL,YLNGTH,YMARGU            Y-Axis physical definition
  SP              SPACE(4)                        SPace: ticks-labels
  AS              IAXSPC(4)                       data Space for each Axis
  LB              BASLOG(4)                       Logrithm Base
  RC              RCON(4)                         Reciprical Constants
  SF              SFX1G,SFY1G,SFX2G,SFY2G         global Scale Factors
  OF              OFFX1G,OFFY1G,OFFX2G,OFFY2G     global OFfsets
  RP              SCALE,PLTANG                    supreme global scale factor
						    and Rotation Parameter
  VS              DRWSPD                          Velocity Select for pen 
						    plotters
  DT              DATIME                          Date and Time on/off flag
  DF                                              set P-phase parameters to 
						    DeFault

  Further HELP is available.  Type:	HELP MUL P+ tt		(MCR)
					?? P+ tt		(in MULPLT)
