  BOTH P AND F PHASE
 
  HA                     	     HAlt
  EX                      	     EXit
  NP        PDLFNA(70)     	     start New PDL
  AP        PDLFNA(70)       	     Append a PDL
  VE                                 print mulplt VErsion
  GO        IDEV,JFILE,JFILE1        GO plot
  GE        IDEV,JFILE,JFILE1        Go plot, Erasing the screen first
  ER        IDEV                     ERase screen
  SC        JFILE,JFILE1             SCan for data extremes
  LI        JFILE,JFILE1             LIst current PDL
  DP        PDLFNA(70)               DumP PDL to file
  LT        LISTXY                   LisT data for debugging
  G?                                 list the known Graphics devices
  AG        IDEV=device              Assign Graphics device
  FN        DATFNA(70)               data set File Name
  GF        KFILE                    Go to (re-open) data File
  RF        KFILE                    Remove data File
  ZF                                 remove (Zero) all data Files
  W>        MCRBUF(80)               Wait for a RSX command to finish
  N>        MCRBUF(80)               do Not wait for a RSX command to finish
  ??        HLPSTR(80)               optain help for a topic

  Further HELP is available.  Type:	HELP MUL P+ tt		(MCR)
					?? P+ tt		(in MULPLT)
	where "tt" is the tag for the desired command.
