 
 UVT100 is a subroutine that provides convenient access to VT100 escape
 sequences for use in creating VT100 screen displays.
 HELP in using UVT100 may be obtained by either of the following commands:

	HELP UVT100 DOCUMENT		Type the document on your terminal
		or
	PRINT LB:[1,2]UVT100DOC.HLP	Print the document on the lineprinter

2 DOCUMENT
 @UVT100DOC
