 
 SYSGEN  is  the  procedure used to tailor and build a version of the RSX-11M
 or  RSX-11M-PLUS operating system for a particular PDP-11 installation.  The
 SYSGEN procedure asks questions about both the software features you wish to
 include  in  your  system,  and  about your system's hardware configuration.
 SYSGEN  uses  that  information  to  assemble  and  task build an RSX-11M or
 RSX-11M-PLUS operating system specifically tailored to your needs. 
 
 You  should  read  both the System Generation and Installation Guide and the
 Release Notes for this release of your operating system before attempting to
 run  the  SYSGEN procedure.  Attempts to run SYSGEN without first consulting
 the documentation may yield undesired results. 
 
 You  should  also  be familiar with the features and structure of the RSX-11
 operating systems before attempting to generate your own  system so you will
 understand the consequences of choosing or omitting various system options.

