
 RMDEMO  is  a task that displays various aspects of system status.  It is
 available for the following terminals: VT05, VT50, VT52, VT100, and LA36.
 Access  is via the RMD command which displays the system memory activity.
 Typing  H  will  display  a  help page listing what options are available
 at  the  present  time.   Hard  copy terminals may display this help page
 by  typing RMD HL.  RMDEMO is fully documented in the RSX-11M-PLUS System
 Manager's Guide.
