 The TASKLIST  command displays a description of each installed task.

 The general format of the TAS command is:

	TAS[KLIST] [taskname][/DEV=ddnn:]

  		taskname    The name of a specific task.

		/DEV=ddnn:  Displays the names and status of all tasks 
                            installed from the specified terminal.

			    If you specify both taskname and /DEV, the
  			    system displays information about the task
                            installed from that device.
 
 For information on the display contents, type HELP TAS CONTENTS.

2 CONTENTS
 The displays contains:

	1.  Task name
	2.  Task version identification
	3.  Partition name
	4.  Task priority 
	5.  Size of task in bytes (octal)
	6.  Load device identification
	7.  Disk address logical block number (octal)
	8.  Task memory state

 The display lists the tasks installed in primary pool and then those 
 installed in secondary pool.  The secondary pool tasks are indicated by 
 a plus sign (+).
