 The general form of the LOAD device driver command is:

	LOA[D] dd:[keyword(s)] 	 


 dd:	   A 2-character ASCII loadable device driver name.

 keywords:
 
   /PAR=parname      Specifies the system-controlled partition (parname) into 
                     which the driver is to be loaded.

   /CTB=cca[b...]    Specifies that the multidriver controller  Controller Table
                     Block (CTB) in the resident data base be modified instead 
                     of the symbol $ddCTB in the loadable data base.
 
   /SIZE=parsize     Specifies the minimum size (in words) of the partition into
                     which the driver is to be loaded.

   /HIGH             Causes the driver to be loaded as high in the partition as 
                     possible.
  
