 SET thing

 The SET command can be used to set something. The following things
 can be set with this command:

 [DAY]TIME	DEBUG		DEFAULT		DEVICE		GROUPFLAGS
 LIBRARY 	[NO]PARTITION   PRIORITY	PROTECTION	QUEUE
 SYSTEM 	TERMINAL

 For information on the SET ACCOUNTING command, see HELP ACCOUNTING SET.
2 DEBUG

 SET DEBUG[/qualifier[s]

	Qualifiers

	/[NO]EXECUTE
	/FULL

 SET DEBUG permits you to see the translation of any DCL command.  The default
 is SET DEBUG/NOEXECUTE.  The MCR command line equivalent to your DCL command
 is printed on your terminal.  If you specify /EXECUTE, the command line is
 printed and the command also executes.  The /FULL qualifier permits you to
 see the logical symbols used by the DCL task.

2 LIBRARY
 SET LIBRARY/DIRECTORY:[g,m]

 The SET LIBRARY/DIRECTORY command establishes the RSX-11M-PLUS 
 directory where system utilities and other nonprivileged system tasks are
 kept.  The command does not create a directory.  This is a privileged command.
 
 For privileged system tasks on RSX-11M-PLUS systems, and all system tasks
 on RSX-11M systems, see HELP SET SYSTEM DIRECTORY.
2 SYSTEM
 SET SYSTEM/qualifier

	Qualifiers

	/DIRECTORY:[g,m]
	/EXTENSION_LIMIT:n
	/[NO]LOGIN
	/PACKETS:n
	/POOL:top:max:total

 This is a privileged command.  See HELP SET SYSTEM qualifier for more 
 information.
3 DIRECTORY
 SET SYSTEM/DIRECTORY:[g,m]

 The /DIRECTORY qualifier establishes the directory where system tasks are 
 kept.  On RSX-11M systems, this directory includes all system tasks.  On
 RSX-11M-PLUS systems, this directory includes only privileged tasks.  
 Nonprivileged tasks on RSX-11M-PLUS systems are placed in the library 
 directory.  See HELP SET LIBRARY.  This command does not create a directory.

3 EXTENSION_LIMIT
 SET SYSTEM/EXTENSION_LIMIT:n

 The /EXTENSION_LIMIT qualifier sets the maximum size to which a task
 can extend itself by means of the EXTEND TASK system directive.

 'n' is specified in bytes, or in 1024-Byte units if suffixed by "K".

3 PACKETS
 SET SYSTEM/PACKETS:n

 The /PACKETS qualifier alters the number of preallocated I/O packets.

 Normally, some number of 18-word I/O packets are set aside in pool and
 retained in a separate queue for use by the QIO directive. This number
 of packets is used to optimize the servicing of QIO requests.

3 POOL
 SET SYSTEM/POOL:top:max:total

 The /POOL qualifier increases the size of the pool, or dynamic storage
 region.  The top argument is the number of 64-byte blocks.  The max 
 argument is the maximum size in decimal words.  The total argument is the
 total size in decimal words.
3 NOLOGIN
#LOGIN
3 LOGIN
 SET SYSTEM/[NO]LOGIN

 The /[NO]LOGINS qualifier enables [disables] logging into the system.

 If you issue this command and then log out, you will have to reboot the
 system to log back in, unless there is another privileged user still
 logged in.
 
2 DAYTIME
#TIME
2 DEFAULTS

 SET DEFAULT [ddnn:][[ufd]]

 The SET DEFAULT command sets your default directory and device, or 
 both.
 
 SET DEFAULT with no parameters returns a nonprivileged user to the 
 login device and UFD.  For privileged users, the unadorned SET 
 DEFAULT returns to the login device, but the UFD remains the same.
2 DEVICE

 SET DEVICE:ddnn:/qualifier[s]
		
		Qualifiers

		 /[NO]CHECKPOINT_FILE[:n]
		 /[NO]LOWERCASE
		 /[NO]PUBLIC
		 /WIDTH:n

 The SET DEVICE command sets the attributes of a device.  Except for 
 setting the width of your own terminal, this is a privileged command.
3 CHECKPOINT_FILE
#NOCHECKPOINT_FILE
3 LOWERCASE
#NOLOWERCASE
3 NOPUBLIC
#PUBLIC
3 NOCHECKPOINT_FILE

 SET DEVICE:ddnn:/CHECKPOINT_FILE:n
 SET DEVICE:ddnn:/NOCHECKPOINT_FILE

 CHECKPOINT_FILE allocates a checkpoint file of 'n' blocks on the
 device. The device must be a Files-11 device and a checkpoint file can
 not already be open on that device.

 NOCHECKPOINT_FILE eliminates a current checkpoint file on the device. 
 The command does not take effect until the checkpoint file is 
 cleared.
3 NOLOWERCASE

 SET DEVICE:ddnn:/LOWERCASE
 SET DEVICE:ddnn:/NOLOWERCASE

 LOWERCASE sets the device to lowercase. The device must be either a termi-
 nal or a line printer.

 If the device is not set to lowercase, all lowercase characters are
 translated to uppercase before being sent to the device.
3 PUBLIC

 SET DEVICE:ddnn:/PUBLIC
 SET DEVICE:ddnn:/NOPUBLIC

 The SET DEVICE:ddnn:/PUBLIC command sets a device to public access. A public
 device can be mounted by anyone.

 The opposite of a public device is a private device.  Use ALLOCATE to 
 create a private device.  
3 WIDTH

 SET DEVICE:ddnn:/WIDTH:n

 The SET DEVICE:ddnn:/WIDTH command sets the buffer width of the device to
 'n' bytes.  Nonprivileged users can set the width of their own 
 terminal only.  SET TERMINAL/WIDTH is the same command for this 
 purpose.

2 GROUPFLAGS

 SET GROUPFLAGS:n[/CREATE] 
 SET GROUPFLAGS:n/DELETE 

 The SET GROUPFLAGS command creates and deletes group global event 
 flags.  The default is to create them.  You must enter the group number.  
 Privileged users can create or delete global event flags for any group.  
 Nonprivileged users can create or delete global event flags for their 
 own group.
2 NOPARTITION
#PARTITION
2 PARTITION

 SET [NO]PARTITION:parname/qualifier[s]

	Qualifiers

	/BASE:n
	/COMMON
	/DEVICE
	/DIAGNOSTIC
	/SIZE:n
	/[NO]SUBPARTITION[:subparname]
	/SYSTEM
	/TASK
	/TOP

 The SET PARTITION command creates or eliminates a partition in the
 system memory.  Including the /NO deletes the partition.

 The parname argument names the partition. This name can be up to six
 Radix-50 characters.

 The /BASE qualifier specifies the starting address of the partition. The
 base address 'n' is specified in 32-word units.

 The /SIZE qualifier specifies the size of the partition in 32-word 
 blocks.

 Other qualifiers are optional.  See HELP SET PARTITION qualifier.

3 COMMON
 SET [NO]PARTITION:parname/COMMON

 The /COMMON qualifier is for RSX-11M only and creates a common 
 partition.

3 DEVICE
 SET [NO]PARTITION:parname/DEVICE

 The /DEVICE qualifier identifies the partition as a common partition 
 for mapping into the device registers, that is, a device common.
 
3 DIAGNOSTIC
 SET [NO]PARTITION:parname/DIAGNOSTIC

 The /DIAGNOSTIC qualifier identifies the partition as a diagnostic 
 partition.  The partition is created without checking the top of memory.
 This qualifier is for RSX-11M-PLUS multiprocessor systems only.

3 NOSUBPARTITION
#SUBPARTITION
3 SUBPARTITION
 SET [NO]PARTITION:parname/[NO]SUBPARTITION:subparname

 The /[NO]SUBPARTITION:subparname qualifier creates or eliminates the named 
 subpartition from the named partition.  RSX-11M only.

3 SYSTEM
 SET [NO]PARTITION:parname/SYSTEM

 The /SYSTEM qualifier identifies the partition as a system-controlled 
 partition.  This qualfier has different effects on RSX-11M and 
 RSX-11M-PLUS.

3 TASK
 SET [NO]PARTITION:parname/TASK

 The /TASK qualifier identifies the partition as a user-controlled 
 task partition.  RSX-11M only.

3 TOP

 SET PARTITION:parname/TOP:value

 The /TOP qualifier moves the top boundary of the specified system 
 according to the form the value is stated in.  The value argument is
 a number of 64-byte blocks, expressed in one of the five following 
 formats:

 +n	moves the top boundary of the partition up by the specified 
   	amount, making the partition larger.

 -n 	moves the top boundary of the partition down by the specified 
	amount, making the partition smaller.

  n	makes the partition the specified size by moving the top 
  	boundary.

 [+]*	moves the top boundary of the partition up as far as possible.

  -*	moves the top boundary of the partition down as far as 
	possible.
2 PRIORITY

 SET PRIORITY:n taskname 

 The SET PRIORITY command changes the priority of an active task. n can
 be from 0 through 250.  
2 PROTECTION

 SET PROTECTION:code[/qualifier[s] filespec[s] 

 	Qualifiers

	/DATE:dd-mmm-yy
	/SINCE:dd-mmm-yy
	/THROUGHL:dd-mmm-yy
	/SINCE:dd-mmm-yy/THROUGH:dd-mmm-yy
	/TODAY
	/EXCLUDE:filespec

 The SET PROTECTION command changes the file protection mask of the
 specified file(s). The argument 'code' consists of four access codes.
 Each access code consists of a positional keyword specifiying the pro-
 tection group (SYSTEM:,OWNER:,GROUP:,WORLD:) followed by a 4-code group
 specifying the protection, as follows:

	R - allow read access to file
	W - allow write access to file
	E - allow file to be extended
	D - allow file to be deleted

 The system default protection is

	(SYSTEM:RWED,OWNER:RWED,GROUP:RWED,WORLD:R)
3 DATE

 SET PROTECTION:code/DATE:dd-mmm-yy filespec[s]

 The /DATE qualifier specifies that you wish the SET PROTECTION command to 
 affect only files created on the given date.

3 SINCE

 SET PROTECTION:code/SINCE:dd-mmm-yy filespec[s]

 The /SINCE qualifier specifies that you wish the SET PROTECTION command to 
 affect only files created on or after the given date.

 You can combine /THROUGH and /SINCE to create a range of dates.
3 THROUGH

 SET PROTECTION:code/THROUGH:dd-mmm-yy filespec[s]

 The /THROUGH qualifier specifies that you wish the SET PROTECTION command to 
 affect only files created on or before the given date.

 You can combine /THROUGH and /SINCE to create a range of dates.

3 TODAY

 SET PROTECTION:code/TODAY filespec[s]

 The /TODAY qualifier specifies that you wish the SET PROTECTION command to 
 affect only files created today.

3 EXCLUDE

 SET PROTECTION:code/EXCLUDE:filespec[s] filespec[s]

 The /EXCLUDE qualifer specifies that you wish the SET PROTECTION command to 
 exclude the named file (or files if named with wildcards) in its  
 action.

2 QUEUE
@DCLSETQ
2 TERMINAL

 SET TERMINAL[:ttnn:]/attribute[s]

 The SET TERMINAL command sets various attributes of your terminal. A
 privileged user can set attributes of any other terminal.

 The RSX-11M/M-PLUS Command Language Reference Manual divides the attri-
 butes into the 3 categories of common use, terminal setup, and task
 setup.   
	  See HELP SET TERMINAL COMMON_USE 
	      HELP SET TERMINAL TERMINAL_SETUP
	      HELP SET TERMINAL TASK_SETUP
	  
	      HELP SET TERMINAL QUALIFIERS
	      HELP SET TERMINAL qualifiername 

3 QUALIFIERS
 SET TERMINAL[:ttnn:]/qualifier[s]

 /DCL	/WIDTH:n	/CRFILL:n	 /[NO]HOLD_SCREEN	/[NO]LOWERCASE

 /MCR	/PAGE_LENGTH:n	/[NO]PRIVILEGED	 /SPEED:(t,r)		/[NO]UPPERCASE

 /LFFILL	/[NO]SERIAL	/[NO]SCOPE	/[NO]TAB	/MODEL:arg

 /[NO]ECHO	/[NO]EIGHT_BIT	/[NO]ESCAPE	/[NO]LOCAL	/[NO]REMOTE

 /[NO]FULL_DUPLEX		/[NO]INTERACTIVE	/[NO]TYPE_AHEAD[:n]

 /ASR33	/KSR33	/ASR35	/LA12	/LA30S	/LA30P	/LA34	/LA38	/LA100

 /LA120	/LA180S	/VT05	/VT50	/VT52	/VT55	/VT61	/VT100	/VT101

 /VT102	/VT105	/VT125	/VT131	/VT132

3 COMMON_USE

 SET TERMINAL[:ttnn:]/attribute[s]

 The following qualifiers set terminal characteristics that are regularly
 needed by the average terminal user. For more information on a parti-
 cular characteristic, type HELP SET TERMINAL characteristic.

	/[NO]BROADCAST
	/DCL
	/[NO]HOLD_SCREEN
	/LOWERCASE
	/MCR
	/[NO]PRIVILEGED
	/[NO]SERIAL
	/SPEED:(t,r)
	/UPPERCASE
	/WIDTH:n
3 NOBROADCAST
#BROADCAST
3 BROADCAST
 SET TERMINAL[:ttnn:]/[NO]BROADCAST

 The SET TERMINAL/NOBROADCAST commands keeps messages from the BROADCAST
 command from breaking through on terminal.  You might choose this option
 if you were printing out a hard copy of a file for reproduction.  The 
 default is /NOBROADCAST.
3 WIDTH

 SET TERMINAL[:ttnn:]/WIDTH:n

 The SET TERMINAL/WIDTH command sets the width of your terminal, that is,
 the length of a line.  n can be from 0 through 132.  Note that a line
 length of zero means no commands can be entered on the terminal.  See also
 HELP SET TERMINAL PAGE.
3 DCL

 SET TERMINAL[:ttnn:]/DCL

 The SET TERMINAL/DCL command sets your terminal to be a DCL terminal.
 Since you must have been a DCL terminal already to be able to issue
 this command, it has little practical value. A privileged user can set
 some other terminal to be DCL.

 If your terminal is an MCR terminal and you wish to change it to a DCL
 terminal, issue the command SET /DCL=TI:.

 If your terminal is a DCL terminal and you wish to change it to an MCR
 terminal, issue the command SET TERMINAL/MCR.
3 ECHO
#NOECHO
3 EIGHT_BIT
#NOEIGHT_BIT
3 ESCAPE
#NOESCAPE
3 FORM_FEED
#NOFORM_FEED
3 FULL_DUPLEX
#NOFULL_DUPLEX
3 NOFULL_DUPLEX

 SET TERMINAL[:ttnn:]/FULL_DUPLEX
 SET TERMINAL[:ttnn:]/NOFULL_DUPLEX

 The /FULL_DUPLEX qualifier instructs the terminal driver to accept 
 input from the specified terminal while simultaneously sending 
 output to it.  This is the default setting.

 The /NOFULL_DUPLEX qualifier disables this capability.  The terminal
 can send or receive, but not simultaneously.
3 HARDCOPY
#SCOPE
3 HFILL
#CRFILL
3 CRFILL
 SET TERMINAL[:ttnn:]/HFILL:n
 SET TERMINAL[:ttnn:]/CRFILL:n

 The SET TERMINAL/CRFILL command sets the number of horizontal fill
 characters generated for your terminal. /HFILL is a synonym.

 Horizontal fill characters are null characters sent to the terminal
 after a carriage return to accomodate the different return speeds of
 different terminal models. Many terminal models perform a mechanical
 carriage return slow enough that the next 'x' characters sent to the
 terminal will be lost. Adding null characters in prevents any real data
 from being lost.
3 HOLD_SCREEN

3 INTERACTIVE
#PASSALL
3 LOCAL
#REMOTE
3 LOWERCASE
#UPPERCASE
3 MCR

 SET TERMINAL[:ttnn:]/MCR

 The SET TERMINAL/MCR command sets your terminal to be an MCR terminal.

 To change back from an MCR terminal to a DCL terminal, issue the MCR
 command SET /DCL=TI:.
3 NOECHO

 SET TERMINAL[:ttnn:]/ECHO
 SET TERMINAL[:ttnn:]/NOECHO

 The SET TERMINAL/[NO]ECHO command sets your terminal to echo [or not]
 input typed on it. Normally, you will want your terminal set to echo.
3 NOEIGHT_BIT

 SET TERMINAL[:ttnn:]/EIGHT_BIT
 SET TERMINAL[:ttnn:]/NOEIGHT_BIT

 The SET TERMINAL/[NO]EIGHT_BIT command sets your terminal to [from]
 eight-bit-character mode.

 /NOEIGHT_BIT is the default. DEC software employs seven-bit ASCII
 (without parity checking).

 /EIGHT_BIT allows the terminal to pass all eight bits of the ASCII
 characters. This attribute is used when a terminal is communicating
 with come device that sends eight-bit ASCII.
3 NOESCAPE

 SET TERMINAL[:ttnn:]/ESCAPE
 SET TERMINAL[:ttnn:]/NOESCAPE

 The SET TERMINAL/[NO]ESCAPE command sets your terminal to [not to]
 recognize terminal escape sequences. 
3 NOFORM_FEED

 SET TERMINAL[:ttnn:]/FORM_FEED
 SET TERMINAL[:ttnn:]/NOFORM_FEED

 The SET TERMINAL/[NO]FORM_FEED command tells the system that your
 terminal does [does not] support hardware form feeds.

 If you are set to /NOFORM_FEED, form feed characters are translated to
 4 line-feed characters.
3 HOHARDCOPY
#SCOPE
3 NOHOLD_SCREEN

 SET TERMINAL[:ttnn:]/HOLD_SCREEN
 SET TERMINAL[:ttnn:]/NOHOLD_SCREEN

 The SET TERMINAL/[NO]HOLD_SCREEN command sets your terminal into [out
 of] hold-screen mode. Hold-screen mode is a mode supported by some CRT
 terminals in which text is presented one page or one line at a time.  

 On VT52-style terminals in hold-screen mode, pressing the SCROLL key alone
 causes one line to scroll off the top of the screen and one line to scroll
 on to the bottom of the screen.  Pressing the SHIFT and SCROLL keys together
 causes one (one screen's worth) of scrolling.  

 See also HELP SET TERMINAL PAGE.

 This command does not work on VT100s and some other video terminals.
3 NOINTERACTIVE
#PASSALL
3 NOLOCAL
#REMOTE
3 NOLOWERCASE
#UPPERCASE
3 NOPASSALL
#PASSALL
3 NOPRIVILEGE
#PRIVILEGE
3 NOREMOTE
#REMOTE
3 NOSCOPE
#SCOPE
3 NOSLAVE
#SLAVE
3 NOTAB
#TAB
3 NOTYPE_AHEAD
#TYPE_AHEAD
3 NOUPPERCASE
#UPPERCASE
3 NOVFILL
#VFILL
3 NOWRAP
#WRAP
3 PAGE
 SET TERMINAL[:ttnn:]/PAGE:n

 The SET TERMINAL/PAGE command sets the number of lines per page on your
 terminal.

 The page length on a CRT terminal is the number of lines on the screen. The
 default differs by terminal model.  See also HELP SET TERMINAL WIDTH.
3 PASSALL

 SET TERMINAL[:ttnn:]/PASSALL
 SET TERMINAL[:ttnn:]/NOINTERACTIVE

 SET TERMINAL[:ttnn:]/NOPASSALL
 SET TERMINAL[:ttnn:]/INTERACTIVE

 The above commands will set your terminal to read-pass-all mode 
 [or not].

 /NOPASALL is the default and means that any characters typed on the
 terminal are interpreted by the terminal driver.  /INTERACTIVE is a 
 synonym.

 /PASSALL means that characters typed on the terminal are passed directly
 to the requesting task without interpretation by the terminal driver. 
 /NOINTERACTIVE is a synonym.
3 PRIVILEGED

 SET TERMINAL[:ttnn:]/PRIVILEGED
 SET TERMINAL[:ttnn:]/NOPRIVILEGED

 The SET TERMINAL/PRIVILEGED command sets your terminal to be a privi-
 leged terminal. A privileged terminal can issue all DCL or MCR 
 commands.

 The SET TERMINAL/NOPRIVILEGED commands sets your terminal 
 nonprivileged.

 This command is, of course, privileged.
3 REMOTE

 SET TERMINAL[:ttnn:]/LOCAL
 SET TERMINAL[:ttnn:]/NOREMOTE

 SET TERMINAL[:ttnn:]/NOLOCAL
 SET TERMINAL[:ttnn:]/REMOTE

 The above commands tell the system that your terminal is [is not] a
 local terminal.  Remote terminals are those which must dial in to a
 telephone connection with the system rather than being directly 
 connected.
3 SCOPE

 SET TERMINAL[:ttnn:]/HARDCOPY
 SET TERMINAL[:ttnn:]/NOSCOPE

 SET TERMINAL[:ttnn:]/NOHARDCOPY
 SET TERMINAL[:ttnn:]/SCOPE

 The above commands tell the system that your terminal is [is not] a
 hardcopy terminal.
3 SLAVE

 SET TERMINAL[:ttnn:]/SLAVE
 SET TERMINAL[:ttnn:]/NOSLAVE

 The SET TERMINAL/[NO]SLAVE command sets your terminal to be [or 
 not to be] a slaved terminal.  A slaved terminal is one that cannot
 issue any unsolicited output.  In general, this means you cannot issue
 any commands other than those requested by some task that has the 
 terminal slaved.  A terminal is often slaved while running a task to
 dedicate the terminal to that task.  The terminal can be left 
 unattended without fear of its being used to gain access to the system.

 SET TERMINAL/ttnn:/NOSLAVE must be issued from a nonslaved terminal.
3 SPEED

 SET TERMINAL[:ttnn:]/SPEED:(t,r)

 The SET TERMINAL/SPEED command sets the transmit and receive speeds of
 your terminal.

 The first of the two numbers entered is the terminal's transmit speed.
 The second is its receive speed. Normally, both of these will be the
 same speed, but RSX-11M-PLUS supports split speed terminals (terminals
 with different transmit and receive speeds.

 The /SPEED setting must match the hardware speed setting on the 
 terminal.
3 TAB

 SET TERMINAL[:ttnn:]/TAB
 SET TERMINAL[:ttnn:]/NOTAB

 The SET TERMINAL/[NO]TAB command tells the system that your terminal
 does [does not] support hardware horizontal tabs. If your terminal does
 not support these, the terminal driver replaces tabs with an appropri-
 ate number of spaces.
3 TASK_SETUP

 The following keywords show terminal characteristics that can be needed
 by system or user tasks. Most system tasks that require these attri-
 butes will set the attributes when they attach the terminal. User tasks
 can also do this. For more information on a particular attribute, type
 HELP SET TERMINAL attribute.

	/[NO]ECHO		/[NO]PASSALL
	/[NO]EIGHT_BIT		/[NO]REMOTE
	/[NO]ESCAPE		/[NO]SLAVE
	/[NO]FULL_DUPLEX	/[NO]TYPE_AHEAD
	/[NO]INTERACTIVE	/[NO]WRAP
	/LOCAL
3 TERMINAL_SETUP

 The following keywords relate to hardware characteristics of a ter-
 minal. For more information on a particular attribute, type HELP SET
 TERMINAL attribute.

 /ASR33	/KSR33	/ASR35	/LA12	/LA30S	/LA30P	/LA34	/LA38	/LA100

 /LA120	/LA180S	/VT05	/VT50	/VT52	/VT55	/VT61	/VT100	/VT101

 /VT102	/VT105	/VT125	/VT131	/VT132

 /FORM_FEED	/PAGE	/HARDCOPY	/SCOPE	/CRFILL:n	/TAB

 /MODEL		/HFFILL
3 TYPE_AHEAD

 SET TERMINAL[:ttnn:]/TYPE_AHEAD[:n]
 SET TERMINAL[:ttnn:]/NOTYPE_AHEAD

 The SET TERMINAL/[NO]TYPE_AHEAD command enables [disables] your
 temrinal's typeahead buffer. The typeahead buffer is 36 characters
 long and holds characters typed when they are typed faster than they
 are accepted as input.

 If your typeahead buffer is full, you cannot enter any characters, and 
 any key you strike returns a buzz, bell, or beep.  In this instance, 
 type a CTRL/X to clear your typeahead buffer.

 On RSX-11M-PLUS systems, yyou can specify a size from 0 through 255 bytes 
 for your typeahead buffer.  This setting is required for use with the 
 RSX-11M-PLUS command SET TERMINAL/SERIAL.  See also HELP SET TERMINAL SERIAL.
3 NOSERIAL
#SERIAL
3 SERIAL
 SET TERMINAL[:ttnn:]/SERIAL
 SET TERMINAL:[ttnn:]/NOSERIAL

 The SET TERMINAL/SERIAL command on RSX-11M-PLUS systems sets your terminal
 for serial command processing.  The default is /NOSERIAL, or parallel 
 command processing.

 Normally on RSX-11M-PLUS, commands are processed as they are entered, 
 regardless of whether other commands are being processed or not.  This 
 means, for instance, that if you type a MACRO and LINK command for the same
 program, the commands will be in conflict and the linking will not succeed.

 Serial command processing, on the other hand, means that the LINK command
 can be typed immediately after the MACRO command, but will not execute
 until the assembly is completed.  

 If you choose serial command processing, you may want to increase the
 size of your terminal's typeahead buffer.  See HELP SET TERMINAL TYPEAHEAD.
3 UPPERCASE

 SET TERMINAL[:ttnn:]/LOWERCASE
 SET TERMINAL[:ttnn:]/NOUPPERCASE

 SET TERMINAL[:ttnn:]/NOLOWERCASE
 SET TERMINAL[:ttnn:]/UPPERCASE

 The above commands tell the system that your terminal does [does not]
 support lowercase. On terminals which do not have this attribute set,
 lowercase characters are converted to uppercase before they are sent
 to the terminal.
3 VFILL

 SET TERMINAL[:ttnn:]/VFILL
 SET TERMINAL[:ttnn:]/LFFILL
 SET TERMINAL[:ttnn:]/NOVFILL
 SET TERMINAL[:ttnn:]/NOLFFILL

 The SET TERMINAL/[NO]LFFILL command tells the system that your terminal
 does [does not] require vertical fill characters. Vertical fill char-
 acters are used to accomodate terminals which cannot accept new data
 characters immediately after performing a vertical tab, line feed, or
 form feed. /VFILL is a synonym.
3 ASR33
#VT61
3 KSR33
#VT61
3 ASR35
#VT61
3 LA12
#VT61
3 LA30S
#VT61
3 LA30P
#VT61
3 LA34
#VT61
3 LA38
#VT61
3 LA100
#VT61
3 LA120
#VT61
3 LA180S
#VT61
3 VT05
#VT61
3 VT50
#VT61
3 VT52
#VT61
3 VT55
#VT61
3 VT100
#VT61
3 VT101
#VT61
3 VT102
#VT61
3 VT105
#VT61
3 VT125
#VT61
3 VT131
#VT61
3 VT132
#VT61
3 VT61
 SET TERMINAL[:ddnn:]/terminalmodel

 The SET TERMINAL/terminalmodel command tells the system what model your
 terminal is. /terminalmodel can be any of the following:

 /ASR33	/KSR33	/ASR35	/LA12	/LA30S	/LA30P	/LA34	/LA38	/LA100

 /LA120	/LA180S	/VT05	/VT50	/VT52	/VT55	/VT61	/VT100	/VT101
 
 /VT102	/VT105	/VT125	/VT131	/VT132

 Certain system tasks, and possibly some user tasks, make use of this
 terminal model information, and therefore it is a good idea to make
 sure that this information is correct.

 Note that you can also use this command in the form SET TERMINAL/MODEL.
 You must use SET TERMINAL/MODEL for non-DIGITAL terminals.  See HELP SET
 TERMINAL MODEL.
3 UNKNOWN
#MODEL
3 MODEL

 SET TERMINAL[:ddnn:]/MODEL:terminalmodel
 SET TERMINAL[:ddnn:]/MODEL:n

 The SET TERMINAL/MODEL command sets a terminal as a particular model.
 The argument to /MODEL can be either the name of a DIGITAL terminal,
 such as VT100, or a number that has been assigned by your system manager 
 for the type of terminal you are using.  n is a number from 0 through 255.

3 WRAP

 SET TERMINAL[:ttnn:]/WRAP
 SET TERMINAL[:ttnn:]/NOWRAP

 The SET TERMINAL/[NO]WRAP command tells the system that your terminal
 is [is not] to wrap around at the end of line. If the terminal is set
 to wrap, the terminal driver issues a carriage-return/line-feed pair
 when you type up to whatever line width the terminal is set for. If
 wrap is not set, no carriage-return/line-feed pair is issued.
2 TIME

 SET [DAY]TIME [date][time]

 The SET TIME command sets the current date and time. The date can be
 entered in either of these forms: dd-mmm-yy, or mm/dd/yy, but it will
 always be displayed in the first format.

 The time is formatted as hh:mm[:ss].

 Either time or date, or both can be specified in the command line. If
 they are both specified, they can be specified in either order.
