
 MCR mcrcommand

 The MCR command allows a DCL user to enter an MCR command and pass it
 to the Monitor Console Routine for processing. 

 For example, the following two commands, issued from DCL, are 
 equivalent:

	>SHOW TIME
	>MCR TIM
