 
    SCH is a task used to display or dymamically alter the Round Robin
 schedule interval and the Executive Disk Swaping interval.  The format of
 the command line is
 
		SCH /SW1.../SWn

 where the switches are any of
 
	/DSP		Display the Round Robin and Swaping interval.
	/RBN:n		Set the Round Robin interval to  n  decimal tics.
	/RBL:n		Set the Round Robin low priority range to  n.
	/RBH:n		Set the Round Robin high priority range to  n.
	/SWP:n		Set the Swap interval to  n  decimal tics.
	/SWL:n		Set the lower priority for swapping to  n.
	/MSF:n		Set the minimum time (tics) between SHF requests.
 
 An error message will result if an attempt is made to set the Swap interval
 to less than the Round Robin interval.
	
