
BRUDIR is a program written whilst investigating the structure of BRU tapes

It will produce a directory listing of a BRU Tapeset (up to some limit -
currently 10000 files) in a format related to that used by PIP.


It has been compiled using both F4P and F77.
-------------------------------------------

This is a pre-release version, being in a state of transition from a
maximum of 1000 files with an internal table of the directory entries
passed, which was searched and each entry zeroed when used, which was
intended to check the synchronisation between UFS entries, headers and
data. This has moved the table to disk, and kept an index in core, a
more sensible one will keep it in the correct locations in a workfile.
