	
	PSD old:=new:

  PSD creates a pseudo device DCB and UCB in pool which has
  the attributes copied from the specified old device. It then
  redirects this pseudo device to the old device specified.


  Note that some programs, including RMD and ACNT refuse to
  use logical devices at any time, and will only use names
  which exist in DCB's.
