		VCO - File Block Compare Utility

	VCO will compare pairs of files block by block (ignoring any record
structure) and produce a list of the differences in ASCII/RAD50/Octal.  It is
designed for use on files that CMP cannot handle (e.g. Task Images or Data 
Files.  In addition VCO will allow wildcard specifications in the command line
so that, for instance, a complete UIC can be compared to a copy of it elsewhere.

	The format of the VCO command line is:-

	VCO Output File=Input File 1,Input File 2/Switches

where:-
	Output File determines where the report of differences goes.  If
		omitted it defaults to TI:
	Input File 1&2 define the files to be compared and may contain any
		meaningful wildcards.
Valid Switches are:-
	/MAX:NNN - override default maximum number of differences (50) that are
		detected before the compare is stopped.
	/VE      - Force VCO to compare latest versions of specified files, 
		rather than attempting to compare identical versions.
	/HE	- Print this Help File
