
 The general form of the Tasklist command is:

	TAS[KLIST]

 It displays on TI: the status of all installed tasks.  The output
 device can be changed by logically assigning (ASN) TI: to another
 device.  Each line of the display has the following format:

	name    ver    par    pri    size    ldev:-lblk    state

 where	name  -	Task name
	ver   -	Task version identification
	par   - Partition name
	pri   -	Task priority
	size  - Size of task in octal bytes
	ldev  -	Load device identification
	lblk  -	Octal logical block number of the task header on the
		load device
	state -	Task memory state, which can be one of:
			FIXED
			CHECKPOINTED
