 
 The SYE Error Log display program has the command format:
 
	SYE>OUTFILE = INFILE</switch(es)>
 
	WHERE:
		OUTFILE 	DEFAULTS TO 	SY:ERRLOG.LST
		INFILE  	DEFAULTS TO 	SY:[1,6]ERROR.SYS
		NO SWITCHES	DEFAULTS TO	A SUMMARY REPORT 
 
     Additional HELP can be obtained using the keywords
	SWITCHES, <switch>,  EXAMPLE
2	SWITCHES
 
	SYE report switches are
 
	/BEG:date&time	Produce report beginning on a certain date and time.
	/DV:dd<n>	Report on a particular device.
	/END:date&time	Produce a report ending on a certain date and time
	/HELP		List help information.
	/NORP		Do not produce detailed report.
	/QU		Do quick report.
	/RP<:class>	Report option switch.
	/SP		Spool output file
	/SU		Produce summary report
 
2	/RP
 
 REPORT OPTION SWITCH
 
 /RP[:CLASS]	The /RP switch requests individual error reports; the
		CLASS parameter is used to specify a general classifica-
		tion of errors to be reported.  CLASS has one of the 
		following values:
 
		NULL	ALL CLASSES
 
		SYS<:type>	System Entries
		   WHERE
		    TYPE is one of the following:
			NULL	ALL types of system entries
			PSE	Entries from PSE operation.
			STA	Error Logging Startup.
			STO	Error Logging Shut Down.
			MOU	Device Mounts and Dismounts
			TIM	System Time Changes
			MSG	System Service Messages.
 
		HDE<:type>	Hardware errors.
		       WHERE
			 TYPE is one of the following:
			NULL	ALL TYPES of hardware errors
			DSK	All disk errors
			MAG	All magnetic tape and dectape errors
			MEM	All cache and main memory parity errors.
 
		TMO:type    	Interrupt time-out errors from disks and  
			magnetic tapes.
			/RP:TMO:DSK	For only disk information
			/RP:TMO:MAG	For only mag. tape information
 
	        VEC	Unidentified Interrupts
 
2	/SU
 
 /SU		Do Summary Report.
 
2	/QU
 
 /QU		Do short (quick) Summary Report.
 
2	/NORP
 
 /-RP or /NORP	Do not include individual error reports.  SYE produces
		a summary report only.  /-RP is the default.
 
2	/DV
 
 /DV:dd<n>	Include in the report only those errors that occured on
		a specified device type or on a specified device unit.
		In addition to standard device types, you may specify:
			CMM	Communications
			UDI	Undefined Interrupts
			PWR	Powerfail
			  (eg:  /DV:PWR)
 
2	/BEG
 
/BEG:TIME-AND-DATE
		Include in the report only errors logged after the 
		specified time and date. The format of the TIME-AND-DATE 
		parameter is:
 
				DD-MON-YR:HR:MI:SE
 		For example:	25-NOV-78:24:30:0
 
2	/END
 
 /END:TIME-AND-DATE
		Include in the report only those errors logged prior to
		the specified date and time. The format of the TIME-AND-DATE 
		parameter is:
 
				DD-MON-YR:HR:MI:SE
 		For example:	25-NOV-78:24:30:0
 
 
2	/HELP
 
 
 /HELP		The /HELP switch causes SYE to display SYE operation 
		instructions.  To obtain this information, the user 
		specifies the /HELP switch in response to the SYE prompt
		as follows:
			SYE>/HELP <CR>
 
2	/SP
 
 /SP		Spool output file.  This is the default.
 
2	EXAMPLES

	EXAMPLE #1 PRINT A SUMMARY REPORT OF ALL ERRORS

		SYE> <CR>



	EXAMPLE #2 PRINT A FULL REPORT OF ALL ENTRIES

		SYE> /RP


	EXAMPLE #3 PRINT A FULL REPORT OF ALL ERRORS ON DB0

		SYE> /DV:DB0

	EXAMPLE #4	PRINT A REPORT ON AL SYSTEM TIME CHANGES USING
			[1,6]ERRSAV.SYS AS INPUT FILE.
 		SYE>/RP:SYS:TIM=[1,6]ERRSAV.SYS

     ALSO REFER TO THE RSX11M ERROR LOGGING MANUAL OR TYPE HELP ERRLOG.
