
 The general form of the STP command is:

	STP [taskname]

 This stops the specified task by setting the stop bit in its Task
 Control Block.  If the taskname is omitted the command stops the task
 requested from the issuing terminal (TTnn).
 
 This command has been named STP so as not to conflict with the
 BASIC command STOP.
