
 SHUTUP is a system task that permits orderly shut down of a multiuser
 RSX-11M system.  It issues warning messages to all terminals connected
 or logged into the system, aborts all nonprivileged tasks, and dismounts
 all devices.  It then halts the system.

 SHUTUP must be run from a privileged terminal.
