The RSX-11M Sample Procedure, or UETP, is an automated procedure
designed to check out the installation of your software and your mass
storage devices.  On an 11/70 it takes about 20 minutes to run.
 
	1. Place scratch tapes in all DEC and magtape drives.
	
	2. Place initialized disk packs in all disk drives you want tested
	   (the data on disks is not disturbed).
	
	3. Run standalone from a privileged, hard copy terminal.
	
	4. Allocate generous checkpoint space (asssume heavy use of 
	   checkpointing).
	
	5. To execute:
	
		>@[2,300]SAM
	
	6. Evaluate the significance of any system error messages received.
