 RMS is the DEC supplied record management system. It is composed
 of a series of user callable subroutines which implement sequential,
 relative, and indexed file organizations and is accessable from 
 MACRO-11, BASIC-PLUS-2, COBOL-11, and other DIGITAL languages.  Other
 HELP information available includes switch and command summaries for
 RMS utilites and for RMS error message numbers.  Type one of the
 following commands to access other RMS utility information:

	HELP RMS ERRORS nnnn	to obtain RMS error code explanations
	HELP xxx		to obtain information on the RMS utilites

			BCK - file backup
			CNV - convert
			DEF - interactive file define
			DSP - file attribute display
			IFL - indexed file load
			RST - file restore

2	ERRORS
	@RMSERROR.HLP
2 BACKUP
	@BCK.HLP
2 CONVERT
	@CNV.HLP
2 DISPLAY
	@DSP.HLP
2 DEFINE
	@DEF.HLP
2 INDEX_FILE_LOAD
	@IFL.HLP
2 RESTORE
	@RST.HLP
