
 RMDEMO is a task that displays some area of system status. It is
 available for the following terminals: VT05, VT50, VT52, VT100,LA36, SYSTIME
 MKII and SYSTIME MKIII.
 Access is via the RMD command which displays the system memory activity.
 Pressing H will display a help page which lists what options are
 available at the present time. Hard copy terminals may display this
 help page by typing RMD HL. RMDEMO is fully documented in
 the RSX-11M SYSGEN manual.
