
 The general form of the Reassign static logical unit numbers
 command is:

	REA[SSIGN] taskname lun ddn:

 where	taskname - the name of the task whose static LUN assignment
		   is to be changed
	lun	 - the octal LUN that is to be changed
	ddn	 - the two letter device name and octal unit number
		   to which the LUN is to be assigned

 Note that this command does not affect a running or fixed-in-memory
 task.  The REDIRECT command is used for dynamic device reconfiguration.
