
   PSE is error logging's preformatting task.  It forms
a snapshot of [1,6]ERR.TMP (the file to which ERL is 
continually writing error data) and renames this temporary
snapshot [1,6]ERROR.TMP.  PSE reformats the raw data and
generates or extends ERROR.SYS.  ERROR.SYS is then suitable
input for the report generator, SYE.
   
      To run PSE:
  
    PSE should be installed from a privileged terminal.
It can then be run from any terminal.
  
  Type :
 
>PSE
PSE>outdev:[ufd]file.typ=indev:

or on one line:
PSE outdev:[ufd]file.typ=indev:

The input UFD and file to PSE are always [1,6]ERROR.TMP.
The input device, output device, UFD and file name and type
may be specified at run time.

The defaults for omitted fields are:

    Field       Default
    _____       _______
   outdev:      SY0:
   [ufd]        [1,6]
   file         ERROR
   .typ         .SYS
   indev:       SY0:
 
