=================================================================
;								;
;	N C P   C O M M A N D   S U M M A R Y 			;
;								;
=================================================================
;
COMMAND		COMMAND			FUNCTION
TYPE		NAME
	
SET	SET STA[TE] LOC[AL]		SET STATE OF LOCAL NODE TO ON
					OR SHUT
	
	SET STA[TE] LIN[E] 		SET STATE OF THE SPECIFIED LINE
   OR	SET STA[TE] KNO[WN] LIN[ES]	OR ALL KNOWN LINES TO ON, OFF OR
					MAINTENANCE
	
	SET PRO[CESS]			LOAD A NETWORK PROCESS
	
	SET LIN[E]			LOAD A NETWORK LINE DRIVER AND
					OPTIONALLY OVERRIDE LINE DRIVER
					PARAMETERS
	
	SET PAS[SWORD]			SET THE RECEIVE OR TRANSMIT 
					ACCESS PASSWORD
	
	SET CEX				LOAD THE COMMUNICATIONS
					EXECUTIVE AND ALL PROCESSES
					MARKED FOR LOAD
	
	SET LOC[AL] LOO[BACK]		ENABLE OR DISABLE LOCAL
					LOOPBACK FOR A LINE
	
CLEAR	CLE[AR] PRO[CESS]		UNLOAD A NETWORK PROCESS OR
					COMMUNICATIONS DEVICE PROCESS
	
	CLE[AR] LIN[E]			UNLOAD A NETWORK LINE DRIVER
	
	CLE[AR] PAS[SWORD]		CLEAR THE RECEIVE OR TRANSMIT
					ACCESS PASSWORD
	
	CLE[AR] CEX			UNLOAD THE COMMUNICATIONS
					EXECUTIVE
	
LOOP	LOO[P] LIN[E]			VALIDATES THAT THE 
					COMMUNICATIONS HARDWARE AND 
					SOFTWARE AT THE LOCAL NODE
					ARE WORKING PROPERLY
	
	LOO[P] REM[OTE]			SENDS A TEST MESSAGE OVER A
					LOGICAL LINK TO THE LOCAL NODE
					OR A REMOTE NODE
	
LOAD	LOA[D] REM[OTE]			INITIATES DOWN-LINE LOADING OF
					A REMOTE NODE
	
SHOW	SHO[W] STA[TUS]			PRINTS THE STATUS OF THE LOCAL
					NODE, A REMOTE NODE, ALL KNOWN
					REMOTES, A LINE OR KNOWN LINES
	
	SHO[W] COU[NTS]			PRINTS THE CURRENT COUNTERS FOR
					THE LOCAL NODE,A LINE OR
					KNOWN LINES
	
ZERO	ZER[O]				ZEROES THE LOCAL NODE, LINE OR
					KNOWN LINE COUNTERS
	
EXIT	EXI[T]				TERMINATES NCP EXECUTION
	
REFER TO THE RSX-11D/M/S AND IAS DECNET SYSTEM MANAGERS GUIDE FOR
A MORE DETAILED EXPLANATION OF EACH OF THESE COMMANDS
