 
	YOU MUST ALSO SUPPLY THE ERROR NUMBER, IE
		HELP FCS ERROR 376
  
 
3	-1
	#377
3	377
	.BAD	BAD PARAMETERS
3	-2
	#376
3	376
	.IFC	INVALID FUNCTION CODE
3	-3
	#375
3	375
	.DNR	DEVICE NOT READY
3	-4
	#374
3	374
	.VER	PARITY ERROR ON DEVICE
3	-5
	#373
3	373
	.ONP	HARDWARD OPTION NOT PRESENT
3	-6
	#372
3	372
	.SPC	ILLEGAL USER BUFFER
3	-7
	#371
3	371
	.DNA	DEVICE NOT ATTACHED
3	-8
	#370
3	370
	DAA	DEVICE ALREADY ATTACHED
3	-9
	#367
3	367
	.DUN	DEVICE NOT ATTACHABLE
3	-10
	#366
3	366
	.EOF	END OF FILE DETECTED
3	-11
	#365
3	365
	.EOV	END OF VOLUME DETECTED
3	-12
	#364
3	364
	.WLK	WRITE ATTEMPTED TO LOCKED UNIT
3	-13
	#363
3	363
	.DAO	DATA OVERRUN
3	-14
	#362
3	362
	.SRE	SEND/RECEIVE FAILURE
3	-15
	#361
3	361
	.ABO	REQUEST TERMINATED
3	-16
	#360
3	360
	.PRI	PRIVLEGE VIOLATION
3	-17
	#357
3	357
	.RSU	SHAREABLE RESOURCE IN USE
3	-18
	#356
3	356
	.OVR	ILLEGAL OVERLAY REQUEST
3	-19
	#355
3	355
	.BYT	ODD BYTE COUNT(OR VIRTUAL ADDRESS)
3	-20
	#354
3	354
	.BLK	LOGICAL BLOCK NUMBER TOO LARGE
3	-21
	#353
3	353
	.MOD	INVALID UDC MODULE NUMBER
3	-22
	#352
3	352
	.CON	UDC CONNECT ERROR
3	-23
	#351
3	351
	.NOD	CALLER'S NODES EXHAUSTED
3	-24
	#350
3	350
	.DFU	DEVICE FULL
3	-25
	#347
3	347
	.IFU	INDEX FILE FUL
3	-26
	#346
3	346
	.NSF	NO SUCH FILE
3	-27
	#345
3	345
	.LCK	LOCKED FROM READ/WRITE ACCESS
3	-28
	#344
3	344
	.HFU	FILE HEADER FULL
3	-29
	#343
3	343
	.WAC	ACCESSED FOR WRITE
3	-30
	#342
3	342
	.CKS	FILE HEADER CHECKSUM FAILURE
3	-31
	#341
3	341
	.WAT	ATTRIBUTE CONTROL LIST FORMAT ERROR
3	-32
	#340
3	340
	.RER	FILE PROCESSOR DEVICE READ ERROR
3	-33
	#337
3	337
	.WER	FILE PROCESSOR DEVICE WRITE ERROR
3	-34
	#336
3	336
	.ALN	FILE ALREADY ACCESSED ON LUN
3	-35
	#335
3	335
	.SNC	FILE ID, FILE NUMBER CHECK
3	-36
	#334
3	334
	.SQC	FILE ID SEQUENCE NUMBER CHECK
3	-37
	#333
3	333
	.NLN	NO FLE ACCESSED ON LUN
3	-38
	#332
3	332
	.CLO	FILE NOT PROPERLY CLOSED
3	-39
	#331
3	331
	.NBF	NO BUFFER SPACE AVAILABLE FOR FILE
3	-40
	#330
3	330
	.RBG	ILLEGAL RECORD SIZE
3	-41
	#327
3	327
	.NBK	FILE EXCEEDS SPACE ALLOCATED, NO BLOCKS
3	-42
	#326
3	326
	.ILL	ILLEGAL OPERATION ON FILE DESCRIPTOR BLOCK
3	-43
	#325
3	325
	.BTP	BAD RECORD TYPE
3	-44
	#324
3	324
	.RAC	ILLEGAL RECORD ACCESS BITS EET
3	-45
	#323
3	323
	.RAT	ILLEGAL RECORD ATTRIBUTES BITS SET
3	-46
	#322
3	322
	.RCN	ILLEGAL RECORD NUMBER, TOO LARGE
3	-47
	#321
3	321
	.ICE	Internal consistency error
3	-48
	#320
3	320
	.2DV	RENAME - TWO DIFFERENT DEVICES
3	-317
	#317
3	49
	.FEX	RENAME - A NEW FILE NAME ALREADY IN USE
3	-316
	#316
3	50
	.BDR	BAD DIRECTORY FILE
3	-51
	#315
3	315
	.RNM	CANNOT RENAME OLD FILE SYSTEM
3	-52
	#314
3	314
	.BDI	BAD DIRECTORY SYNTAX
3	-53
	#313
3	313
	.FOP	FILE ALREADY OPEN
3	-54
	#312
3	312
	.BNM	BAD FILE NAME
3	-55
	#311
3	311
	.BDV	BAD DEVICE NAME
3	-56
	#310
3	310
	.BBE	BAD BLOCK ON DEVICE
3	-57
	#307
3	307
	.DUP	ENTER - DUPLICATE ENTRY IN DIRECTORY
3	-306
	#306
3	58
	.STK	NOT ENOUGH STACK SPACE(FCS OR FCP)
3	-59
	#305
3	305
	.FHE	FATAL HARDWARE ERROR ON DEVICE
3	-60
	#304
3	304
	.NFI	FILE ID WAS NOT SPECIFIED
3	-61
	#303
3	303
	.ISQ	ILLEGAL SEQUENTIAL OPERATION
3	-62
	#302
3	302
	.EOT	END OF TAPE DETECTED
3	-63
	#301
3	301
	.BVR	BAD VERSION NUMBER
3	-64
	#300
3	300
	.BHD	BAD FILE HEADER
3	-65
	#277
3	277
	.OFL	DEVICE OFF LINE
3	-66
	#276
3	276
	.BCC	BLOCK CHECK, CRC, OR FRAMING ERROR
3	-67
	#275
3	275
	.ONL	DEVICE ONLINE
3	-68
	#274
3	274
	.NNN	NO SUCH NODE
3	-69
	#273
3	273
	.NFW	PATH LOST TO PARTNER
3	-70
	#272
3	272
	.BLB	BAD LOGICAL BLOCK
3	-71
	#271
3	271
	.TMM	TOO MANY OUTSTANDING MESSAGES
3	-72
	#270
3	270
	.NDR	NO DYNAMIC SPACE AVAILABLE
3	-73
	#267
3	267
	.CNR	CONNECTION REJECTED
3	-74
	#266
3	266
	.TMO	TIMEOUT ON REQUEST
3	-75
	#265
3	265
	.EXP	FILE EXPIRATION DATE NOT REACHED
3	-76
	#264
3	264
	.BTF	BAD TAPE FORMAT
3	-77
	#263
3	263
	.NNC	NOT ANSI "D" FORMAT BYTE COUNT
3	-78
	#262
3	262
	.NNL	NOT NETWORK LUN
3	-79
	#261
3	261
	.NLK	TASK NOT LINKED TO SPECIFIED ICS/ICR INTERRUPTS
3	-80
	#260
3	260
	.NST	SPECIFIED TASK NOT INSTALLED
3	-81
	#257
3	257
	.FLN	DEVICE OFFLINE WHEN OFFLINE REQUEST ISSUED
3	-82
	#256
3	256
	.IES	INVALID ESCAPE SEQUENCE
3	-83
	#255
3	255
	.PES	PARTIAL ESCAPES SEQUENCW
3	-84
	#254
3	254
	.ALC	ALLOCATION FAILURE
3	-85
	#253
3	253
	.ULK	UNLOCK FAILURE
3	-86
	#252
3	252
	.WCK	WRITE CHECK FAILURE
 
 
#
 UNKNOWN QUALIFIER
 
	At present FCS HELP is limited to HELP FCS ERROR NN.
