		DOB - Macro-11 Disassembler
		===========================

 DOB  will  disassemble  a  MACRO-11  object  file,  which  may  be  a
 standalone  file  or  part  of  an  object library. The format of the
 command to DOB is:-

	DOB	output-filespec=input-filespec

 The  output-filespec  contains  the disassembled code and defaults to
 TI: if nothing is specified, and to SY:.DOB if a name is given.
 The    input-filespec  defines  the  object  file,  and  defaults  to
 SY:DISOBJ.OBJ. To disassemble a file from an object library type

	DOB	output-filespec=library-name/LB:module-name

 where  the  library-name defaults to LB:[1,1]SYSLIB.OLB if nothing is
 given, and to  SY:.OLB  if  a  name is specified, and the module-name
 represents the name of the module within the library.

 An  additional  switch  /MA  will  output  the disassembled file in a
 format suitable for input into the Macro Assembler.
