 
		DMP  -- FILE DUMP UTILITY
 
     To run DMP type
 
		DMP outfile=infile/switch(s)
 
 where  outfile  can be an RSX11M file specifier, or the user's
 terminal, TI:.  
 DMP will dump records up to 2048 bytes in length by default.
 For larger records reinstall DMP with an increment.
 
     For HELP with the DMP switches type
 
		HELP DMP SWITCHES
2	SWITCHES
 
  NONE		Defaults to word mode octal dump.
  /AS		ASCII dump.
  /BA:n:m	Specifies a doubleword base block address. n is high order.
  /BL:n:m	Specifies the range of physical blocks to be dumped.
  /BY		Data will be dumped in byte octal format.
  /DC		Data will be dumped in decimal word format
  /DENS:n	Specifies density of TU16 mag tape.
  /FI:n:m	Specify file by File Id instead of File Specification
  /HD[:F]	Dump the header of a file formatted.
  /HD:U		Dump the header of a file unformatted.
  /HF		Format all header blocks in file, dump others as defined by
		the other switches.
  /HX		Dump in hexadecimal byte format
  /ID		Display DMP's version number
  /LB		Display logical blocks for a file
  /LW		Dump data in hexadecimal double word format.
  /MD[:n]	Memory dump.  Do not reset line numbers at block boundaries.
  /R5		Dump data in RAD50 format.
  /RC		Dump a record at a time in format defined by the other switches.
  /RW		Rewind magtape before commencing dump.
  /SP		Spool the file to the line printer
  /WD		Dump data in hexadecimal word format.
