	ERROR
   To display the error message corresponding to a given error code type
 HELP DIRECTIVES ERROR <error-code> where <error-code> is a -decimal or 3 
 digit octal number, or HELP DIRECTIVES ERROR <mnemonic> where <mnemonic>
 is the three character error mnemonic.  Example:  HELP DIRECTIVES ERROR 376,
 HELP DIRECTIVES ERROR -2, or HELP DIRECTIVES ERROR INS.
3	377
	#-1
3	UPN
	#-1
3	-1 
 .UPN	-1	377	Insufficient dynamic memory.
3	376
	#-2
3	INS
	#-2
3	-2	
 .INS	-2	376	Specified task not installed. 
3	375
	#-3
3	PTS
	#-3
3	-3 
 .PTS	-3	375	Partition too small for task. 
3	374
	#-4
3	UNS
	#-4
3	-4 
 .UNS	-4	374	Insufficient dynamic memory for send. 
3	373
	#-5
3	HWR
	#-5
3	-5 
 .HWR	-5	373	Unassigned LUN. 
3	372
	#-6
3	HWR
	#-6
3	-6 
 .HWR	-6	372	Device driver not loaded or parity error on region. 
3	371
	#-7
3	ACT
	#-7
3	-7 
 .ACT	-7	371	Task not active.
3	370
	#-8
3	ITS
	#-8
3	-8 
 .ITS	-8	370	Directive inconsistant with task state. 
3	367
	#-9
3	FIX
	#-9
3	-9 
 .FIX	-9	367	Task already fixed/unfixed. 
3	366
	#-10
3	CKP
	#-10
3	-10
 .CKP	-10	366	Issuing task not checkpointable. 
3	365
	#-11
3	TCH
	#-11
3	-11
 .TCH	-11	365	Task is checkpointable.
3	361
	#-15
3	RBS
	#-15
3	-15
 .RBS	-15	361	Receive buffer is too small. 
3	360
	#-16
3	PRI
	#-16
3	-16
 .PRI	-16	360	Privilege violation. 
3	357
	#-17
3	RSU
	#-17
3	-17
 .RSU	-17	357	Resource in use. 
3	356
	#-18
3	NSW
	#-18
3	-18
 .NSW	-18	356	No swap space available. 
3	355
	#-19
3	ILV
	#-19
3	-19
 .ILV	-19	355	Illegal vector specified.
3	260
	#-80
3	AST
	#-80
3	-80
 .AST	-80	260	Directive issued/not issued from AST.
3	257
	#-81
3	MAP
	#-81
3	-81
 .MAP	-81	257	Illegal mapping specified. 
3	255
	#-83
3	IOP
	#-83
3	-83
 .IOP	-83	255	Window has I/O in progress.
3	254
	#-84
3	ALG
	#-84
3	-84
 .ALG	-84	254	Alignment error. 
3	253
	#-85
3	WOV
	#-85
3	-85
 .WOV	-85	253	Address window allocation overflow.
3	252
	#-86
3	NVR
	#-86
3	-86
 .NVR	-86	252	Invalid region ID. 
3	251
	#-87
3	NVW
	#-87
3	-87
 .NVW	-87	251	Invalid address window ID. 
3	250
	#-88
3	ITP
	#-88
3	-88
 .ITP	-88	250	Invalid TI parameter.
3	247
	#-89
3	IBS
	#-89
3	-89
 .IBS	-89	247	Invalid send buffer size (greater than 255.).
3	246
	#-90
3	LNL
	#-90
3	-90
 .LNL	-90	246	LUN locked in use. 
3	245
	#-91
3	IUI
	#-91
3	-91
 .IUI	-91	245	Invalid UIC. 
3	244
	#-92
3	IDU
	#-92
3	-92
 .IDU	-92	244	Invalid device or unit.
3	243
	#-93
3	ITI
	#-93
3	-93
 .ITI	-93	243	Invalid time parameters. 
3	242
	#-94
3	PNS
	#-94
3	-94
 .PNS	-94	242	Partition/region not in system.
3	241
	#-95
3	IPR
	#-95
3	-95
 .IPR	-95	241	Invalid priority (greater than 250.).
3	240
	#-96
3	ILU
	#-96
3	-96
 .ILU	-96	240	Invalid LUN. 
3	237
	#-97
3	IEF
	#-97
3	-97
 .IEF	-97	237	Invalid event flag. 
3	236
	#-98
3	ADP
	#-98
3	-98
 .ADP	-98	236	Part of DPB out of users space.
3	235
	#-99
3	SDP
	#-99
3	-99
 .SDP	-99	235	DIC or DPB size invalid. 
