		CVL - CHANGE VOLUME LABLE
 
	CVL is a mini-utility which will allow an RSX11M user to view
 disk initialization parameters not displayed via the /VI switch of
 the MOUNT command, and to reset certain critical parameters.
 
	The command line is   CVL  DDn:newname/SW1/SW2/....
 
where  newname  is the newname for the volume and  /SW is any of
 
		/VI		Display volume information but change
				nothing.
		/LRU	= NN	Change the LRU for the volume to NN.
		/MAXEXT	= NN	Change the MAXEXT for the volume to NN.
		/MXF	= NNNN	Increase the maximum number of files 
				allowed on the volume to NNNN.
		/WINDOW	= NN	Change the default window pointers for the
				volume.
		/FPRO   = [RWED,RWED,RWED,RWED]  where any of RWED used
				sets READ, WRITE, EXTEND, or DELETE
				privleges for SYSTEM, OWNER, GROUP, and
				WORLD,  respectively.
 
 Note that in all cases, NN (NNNN) is a decimal value, the user must be
 privileged  and the volume must be mounted.  Also as an aid in recordkeeping,
 the date the volume was initialized is displayed.


 Note also that, except when /VI is used, the label is always modified.
