		BOILER - Boiler-Plate Files
		===========================

 Four  boiler-plate  files  are  provided  in  [1,1] to aid in program
 development.  these are:-

        BOILER.CMD - Command  file to generate a standard command file
                     to assemble and build a MACRO-11 utility.
        BOILER.MAC - Skeleton  MACRO-11  utility demonstrating all the
                     useful things like CSI, GCML, Files-11, SST traps
                     and so on.
        BOILER.MUN - Skeleton   MUNG  program  illustrating  the  .MUN
                     linkage  machanism used to implement the MUN HELP
                     facility.
        BOILER.SUB - Skeleton  MACRO-11 subroutine header illustrating
                     the    standard    calling   interface,  and  the
                     recommended method of using PRMCHK.

 For  more  information  on  these  files  either  read  them  or  the
 descriptive document BOILER.DOC.
