
 The general form of the ALTer task priority command is:

	ALTer taskname/keyword=n

 Where taskname is the name of the task and keyword is either:-

	RPRI - to change the running priority of the task
	PRI  - to change the static and, if the task is executing, the
		running priority of the task

 In both cases n is specified in octal, unless a trailing period is included.
