
 The general form of the Allocate (or discontinue) Checkpoint file
 Space command is:

	ACS ddn:/BLKS=m

 Where m is the decimal number of blocks to be allocated on device
 ddn: (two letter device mnemonic and zero to two octal digit unit
 number).  If m is zero, the use of the file will be discontinued.
