1 SPY
	INPUTS TO SPY - COMMANDS ARE TERMINATED WITH CARRIAGE RETURN <CR>.
		I <INTERVAL IN SECONDS>		! CHANGE UPDATE INTERVAL
		C 	! CLEAR SCREEN AND RENEW DISPLAY
		D1 	! SELECT DISPLAY 1
		D2 	! SELECT DISPLAY 2
		X 	! EXIT
		^Z	! EXIT

	THE FOLLOWING COMMANDS PERTAIN TO DISPLAY #2 ONLY

		R <DEF>,<ALL>,<TTN>,<BAN>,<TTN-M>,<BAN-M>
			! SET RANGE OF TERMINAL TO DISPLAY
			! <ALL> - SET FOR ALL TERMINALS ON SYSTEM
			! <DEF> - SET TO DEFAULT RANGE (TASK BUILD DEFINED)
			! <TT OR BA> INDIVIDUAL OR INCLUSIVE RANGE
			! UNIT NUMBERS ARE IN OCTAL
		L <NUM> ! # OF LINES TO DISPLAY (USUALLY 24)
	
	TO RUN SPY ENTER -
		PDS> SPY<N> <TTPYE>
	WHERE N CAN BE 1 OR 2, TO SET TO DISPLAY 1 OR 2. IF <N> NOT GIVEN
	SPY WILL RUN THE DEFAULT DISPLAY (TASK BUILD PARM).
	<TTYPE> IS THE TERMINAL TYPE SPY IS RUNNING ON E.G. 'BEEHIVE' OR
	'VT52'. REFER TO SPYIN.FTN TO SET UP FOR VARIOUS TERMINAL TYPES.
	IF <TTYPE> NOT GIVEN THE DEAULT TERMINAL TYPE WILL BE USED (SET AT
	TASK BUILD TIME).
