 
 SCR is a program designed to copy the screen memory of a Teleray terminal
 to a disk file.  Format of the SCR command line is:
 
    SCR [filename][/switch(es)]
 
 where  filename    is the name of the (optional) output file
		    Default filename - LP.LST
	/switch     is one or more of the following switches:
		    /AP  -  Append to an existing file
		    /HE  -  Help (prints out this text)
		    /SP  -  Spool the output file to the printer
		    /TI  -  Include time stamp on output file
 
 The default file (LP.LST) is spooled to the system printer and then deleted.
 
  To obtain a hardcopy of the information present on the screen of Teleray
  terminals the SCReenpr command can be used. It will cause the Teleray to
  transmit its pages of screen memory to a PDP print file which is subse-
  quently spooled to the system printer and deleted. SCReenpr can not be used
  while another program has the user's terminal attached for I/O. If the
  system spooler is not the QUEUE Manager, then the print file, LP.LST, will
  not be deleted upon printing.
