	You must also include the error number and the minus sign.
		For example: HELP RMS ERROR -592
 
3       -16
	TASK STACK TOO SMALL - Use "STACK" option of TKB to
	increase the size of the stack.
 
3       -32
	The file you accessed was locked.
 
3       -48
	File was currently active and your request could not be
	handled
 
3       -64
	Virtual block number (VBN) does not exist in the file
 
3       -80
	llegal alignment for placement control
 
3       -96
	File extension value was zero and explicit extension was
	requested
 
3       -112
	Tape records not ANSI-D format
 
3       -128
	Allocation option was invalid
 
3       -144
	Synchronous operation request issued from asynchronous
	completion routine
 
3       -160
	Read failure of file attributes
 
3       -168
	Invalid file ID
 
3       -176
	Write failure of file attributes
 
3       -192
	Bucket size exceeds 32 blocks
 
3       -208
	Area bucket size exceeds 32 blocks
 
3       -224
	Control block length is invalid
 
3       -232
	Attempted to backspace beyond the front of the tape
 
3       -240
	Buffer pool not on word boundary
 
3       -256
	Pool size not an even multiple value.
 
3       -272
	RMS internal error. Contact DEC.
 
3       -288
	Only one access stream permitted on sequential files
 
3       -304
	No changes permitted on this key
 
3       -320
	Bucket corupted. Restore the file from a backup copy.
 
3       -352
	File organization incompatible for operation requested
 
3       -368
	File processor error. RMS could not create the file.
 
3       -384
	Record requested by DELETE or REWRITE does not exist
	or the system could not find it.
 
3       -400
	RMS file processor could not close the file.
 
3       -416
	Data area number was invalid.
 
3       -432
	Record accessed by Relative Access was previously deleted.
 
3       -448
	The device does not support the file type used.
 
3       -456
	I/O bucket was needed before Deferred Write was finished
 
3       -464
	Filespec syntax error (illegal filename was used).
 
3       -480
	RMS buffer pool does not have enough free space.
 
3       -496
	No UIC on this device.
 
3       -512
	Hardware device not ready (not on-line).
 
3       -520
	Device positioning error.
 
3       -528
	Invalid key data type.
 
3       -544
	Attempted to write a duplicate key value where no duplicates
	were allowed.
 
3       -560
	Device directory is full.
 
3       -576
	ORGANIZATION declaration does not match the file descriptor
	contained in the file header.
 
3       -592
	End-of-file detected on a sequential file.
 
3       -608
	File name string area is too short.
 
3       -616
	File expiration date has not been reached.
 
3       -624
	RMS dynamic file extension failed.
 
3       -640
	File access block is invalid.
 
3       -656
	ACCESS declaration incompatible with I/O operation attempted.
 
3       -672
	File already exists.
 
3       -680
	Invalid file ID
 
3       -688
	Invalid combination of KEY characteristics.
 
3       -704
	File marked as Private by another user.
 
3       -720
	File is not in the specified directory.
 
3       -736
	File did not exist when RMS tried to open it.
 
3       -752
	Syntax error in file name.
 
3       -768
	ACCESS declaration incompatible with ORGANIZATION.
 
3       -784
	Disk is full. File could not be created or extended.
 
3       -800
	Area number for index is invalid.
 
3       -816
	The specified index was not created.
 
3       -832
	The file referenced was not open.
 
3       -848
	More than 254 keys and/or areas were defined.
 
3       -864
	$INIT or $INITIF call never issued.
 
3       -880
	File operation not allowed. For example: you tried to
	delete or extend a tape file.
 
3       -896
	Record length field is invalid for sequential file.
 
3       -912
	Record is not connected to the access stream.
 
3       -928
	No key was given during a random access operation.
 
3       -944
	Relative record key value was negative during a random
	access operation.
 
3       -960
	Invalid KEY value on read operation.
 
3       -976
	Invalid KEY size.
 
3       -992
	Invalid area number in key.
 
3       -1008
	Non-ANSI tape label detected.
 
3       -1024
	Another file is already open on the logical unit number.
 
3       -1040
	Logical unit number is invalid.
 
3       -1048
	Attempted to extend a file that wasn't full.
 
3       -1056
	Invalid location specified during placement control.
 
3       -1072
	I/O buffer(s) corrupted.
 
3       -1088
	File could not be deleted.
 
3       -1104
	Attempted to access a Relative file beyond its maximum
	record number or relative record number was negative.
 
3       -1120
	Maximum record size was set to zero at creation time.
 
3       -1136
	File name variable in OPEN statement did not contain an even
	number of elements.
 
3       -1152
	Attempted to write to the middle of a sequential file.
 
3       -1168
	Not enough memory to open the indexed file.
 
3       -1184
	No primary key was defined when the indexed file was created.
 
3       -1216
	File placement out of order.
 
3       -1232
	Invalid file ORGANIZATION.
 
3       -1248
	File prologue corrupted. Re-build the file from a backup copy.
 
3       -1264
	A key was specified beyond the end of the record.
 
3       -1280
	Date and time field of the file directory corrupted. Re-build
	the file from a backup copy.
 
3       -1296
	Priveledge violation.
 
3       -1328
	Illogical record access option.
 
3       -1344
	Both FORTRAN forms control and Carriage Return control specified.
 
3       -1376
	Read failure on file block.
 
3       -1392
	Attempted to WRITE a record in a Relative file that already
	had a record in that location. Use REWRITE instead.
 
3       -1408
	Invalid Record File Address (RFA).
 
3       -1424
	Invalid record format.
 
3       -1440
	Record is currently marked as private by another job.
 
3       -1456
	Filespec could not be removed from the directory.
 
3       -1472
	Record does not exist in the file.
 
3       -1488
	Attempted to FREE a bucket that wasn't locked.
 
3       -1504
	Invalid record processing option.
 
3       -1520
	Read failure on file prologue.
 
3       -1536
	Indexed file is corrupted. Re-create it from a backup copy.
 
3       -1552
	Record is currently active.
 
3       -1584
	The record is too big for the user buffer.
 
3       -1592
	WRITE or REWRITE request failed. The file has been corrupted.
	Re-create it from a backup copy.
 
3       -1600
	The primary key was not in increasing order during a sequential
	WRITE to an indexed file.
 
3       -1616
	WRITE access not allowed on an existing sequential file.
 
3       -1632
	Invalid key size.
 
3       -1648
	Stack was too big to be saved during asynchronous record
	operation.
 
3       -1664
	RMS and the operating system are not communicating properly.
	Report this problem to DEC.
 
3       -1680
	The index is corrupted. Re-create the file from a backup copy.
 
3       -1696
	Syntax error in filespec "type" declaration.
 
3       -1728
	User buffer length is zero.
 
3       -1744
	Syntax error in filespec version number.
 
3       -1760
	Non-zero relative volume number.
 
3       -1768
	Wildcard(s) not allowed in filename specification.
 
3       -1776
	Write failure on file block.
 
3       -1784
	Disk or tape has been "write protected" and accessed for WRITE.
 
3       -1792
	Error while writing prologue.
 
3       -1808
	Next record field contains an odd address.
 
3       -1824
	File specification contains an extra field.
 
