				   TERMINAL
 
  The TERMINAL commandestablishes terminal type for a specified terminal.   The
 supported standard terminal types are:

	ASR33     ASR35     KSR33     LA30P     LA30S     LA36
       	LA120     LA180S
	VT61      VT100
 
  The general format of the TERMINAL command is:
  TERminal            !  Displays the users terminal type at the user
 terminal.
			 When prompted for a terminal the user enters <CR> to
			 have all terminal settings displayed.
  TERminal TTn: terminal type  !  Sets terminal TTn: to the specified terminal
				  type.  A nonpriviledged user can display the
				  terminal type for any terminal, but only
				  establish terminal type for TI:.  A priviledged
       	      		     			    				  user can establish terminal type for any
				  terminal.
 
  The NOWRAP command performs the same function as SET /NOWRAP.
 
  Note:   NOW        <=>   SET /NOWRAP
	  NOW TT3    <=>   SET /NOWRAP=TT3:
 
  For more information see the MCR Operations Manual.
 
