			     TOTAL BLOCKS
 
 
The general format of the TOTALBLOCKS command is:
 
TOTalblocks                   ! Display total blocks used and allocated to the
				current UIC.
TOTalblocks [g,m]             ! Display total blocks used and allocated to the
				specified UIC ([g,m]).
 
The TOTALBLOCKS command performs the same function as the PIP /TB switch.
 
Note:    TOT        <=>   PIP /TB
	 TOT [1,2]  <=>   PIP [1,2]/TB
 
